Naloga 1:

dh_{skakalnice} =^√(h_{skakalnice}/h_{mize})dD = 1 mm. Naloga 2: dw ds = (1/s_0)(s/^√s^2_0 − s^2); P = 1 −^√1 − s^2_1/s^2_0 ≈ s^2_1/(2s^2_0) = 5 × 10^{−3}.