99/01/26 16.18

Scale=5:1

GND piece No.2 (7.5 mm)

2

5

0.3

0.6 2.5

7.5

2.54 0.7

7.5 2.5

0.7

real size

-30

-20

-10

0

10

20

-10 -5 0 5 10 15 20