m(Kπ) ΜGeV/c^2Ν

Events/(0.01 GeV/c^2)

a) D^0

0 5 10 15 20 25 30 35 40 45

1.4 1.5 1.6 1.7 1.8 1.9 2 2.1 2.2 2.3