proton - pion invariant mass (GeV/c^2)

a.) no PID

proton - pion invariant mass (GeV/c^2)

b.) PID: l_p Γ l_π (for +charged)

0 100 200 300 400 500 600 700 800

1.08 1.09 1.1 1.11 1.12 1.13 1.14 1.15

0 100 200 300 400 500 600 700 800

1.08 1.09 1.1 1.11 1.12 1.13 1.14 1.15