Cerenkov angle of photons

45.32 / 34 P1 1582. P2 0.4965E-01 P3 0.7037E-03 P4 -8589. P5 0.4385E+06 P6 -0.4163E+07

θ_c (rad) number of photons

16 ch PMT

Cerenkov angle of photons

600.0 / 41 P1 0.5942E+05 P2 0.4940E-01 P3 0.9895E-03 P4 -0.8441E+06 P5 0.4792E+08 P6 -0.4440E+09

θ_c (rad) number of photons

4 ch PMT

0

500

1000

1500

2000

2500

3000

3500

4000

4500

0.045 0.05 0.055 0

1000

2000

3000

4000

5000 x 10^2

0.045 0.05 0.055