Good match M1 |δp| < 3 ∧ |δφ| < 3 M1b ⊕ b-layer association M1b^+ ⊕ δp < 1 ∧ δφ > −1 M1b^{++} ⊕ δp < 0 ∧ δφ > 0 Imprecise ECAL M2 −3 < δp < 1 ∧ −10 < δφ < −3 relevant for p_T ≤ 10 GeV;

selects tails of the ECAL measurement Poor ID M3 δp > 1 ∧ δφ < 3 early hard bremsstrahlung; p_T underestimated Poor ECAL M4 δp < −3 relevant for p_T ≲ 30 GeV; hard bremsstrahlung after a good p_T measurement Unknown M0 all cuts failed relevant for p_T ≲ 20 GeV; occurs due to multiple scattering

a a