3. TIME INDEPENDENT METHOD e7 - e37 (253 fb^{−1})

N_{RS} = 73997 ± 462 N_{WS} = 0 ± 92

r_D =

N_{WS} N_{RS} · ε^t_{RS} ε^t_{WS} = 0 ± 92 73997 ± 462

· (0.437 ± 0.005) = (0.00 ± 0.54) ·10^{−3}

U. Bitenc, J. Stefan Institute, Ljubljana: D^0 mixing search in D^0 → Keν 8 BGM, April 5th 2005