theta cerenkov

r070 RICH1

0

250

500

750

1000

0 0.1 0.2 0.3 0.4 0.5

93.11 / 75 P1 98.47 P2 0.2954 P3 0.1148E-01 P4 18.37 P5 -24.85 dθ=-0.0073877 θ_c(rad)

θ_c(rad)

N

-0.5

-0.25

0

0.25

0.5

-0.4 -0.2 0 0.2 0.4

ring in cerenkov space tx(rad) ty(rad) track geo acc1 active surface 0

200

400

600

800

0.25 0.5 0.75 1

PMT cell acc.=0.995471 Full acc.= 0.591646

NHIT 0

2000

4000

6000

8000

0 10 20 30 40

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

10300 19122 0.9761 1.066 0.000 0.000 0.1912E+05

NHIT, thc in 3 sigma 0

5000

10000

15000

0 10 20

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

10301 19122 0.7902E-01 0.3046 0.000 0.000 0.1912E+05

nf= 0.06 nb= 0.02 np= 0.08 0

50

100

150

200

0 50 100 150 200

PMT hits

TDC Tracker dif sum1

r070 MWPC

0

1000

2000

3000

4000

-200 -150 -100 -50

TDC Tracker dif sum2 0

100

200

300

400

-100 -50 0 50 100

TDC Tracker dif sum3 0

1000

2000

3000

-200 -150 -100 -50

TDC Tracker dif sum4 0

100

200

300

400

-100 -50 0 50 100

TDC Tracker dif sum5 0 500 1000

1500

2000

-200 -150 -100 -50

TDC Tracker dif sum6 0

100

200

-100 -50 0 50 100

TDC Tracker dif sum7 0

1000

2000

-200 -150 -100 -50

TDC Tracker dif sum8 0

100

200

300

400

-100 -50 0 50 100

SCINTILLATOR TDC 1

r070 SCINTILLATORS

0

10

20

0 500 1000 1500

SCINTILLATOR ADC 1 0

500

1000

1500

2000

0 500 1000 1500

SCINTILLATOR TDC 2 0

5

10

0 500 1000 1500

SCINTILLATOR ADC 2 0

2000

4000

6000

0 500 1000 1500

SCINTILLATOR TDC 3

-1

-0.5

0

0.5

1

0 500 1000 1500

SCINTILLATOR ADC 3 0

500

1000

1500

0 500 1000 1500 r070 SCINTILLATORS

-20

0

20

-20 0 20

track (x,y) at T1

-20

0

20

-20 0 20

track (x,y) at T2

-40

-20

0

20

40

-40 -20 0 20 40

track (x,y) at SC1

-40

-20

0

20

40

-40 -20 0 20 40

track (x,y) at SC2

-40

-20

0

20

40

-40 -20 0 20 40

track (x,y) at SC3