theta cerenkov

r085 RICH1

0

500

1000

1500

0 0.1 0.2 0.3 0.4 0.5

562.3 / 75 P1 1364. P2 0.2982 P3 0.1328E-01 P4 310.0 P5 -571.7 dθ=-0.0101748 θ_c(rad)

θ_c(rad)

N

-0.5

-0.25

0

0.25

0.5

-0.4 -0.2 0 0.2 0.4

ring in cerenkov space tx(rad) ty(rad) track geo acc1 active surface 0

50

100

150

0.25 0.5 0.75 1

PMT cell acc.=0.995358 Full acc.= 0.587697

NHIT 0

100

200

0 10 20 30 40

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

10300 3929 15.11 7.368 0.000 11.00 3918.

NHIT, thc in 3 sigma 0

200

400

600

0 10 20

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

10301 3929 5.750 2.909 0.000 0.000 3929.

nf= 4.62 nb= 1.10 np= 5.75 0

50

100

150

200

0 50 100 150 200

PMT hits

TDC Tracker dif sum1

r085 MWPC

0

200

400

600

800

-200 -150 -100 -50

TDC Tracker dif sum2 0

20

40

60

80

-100 -50 0 50 100

TDC Tracker dif sum3 0

200

400

600

-200 -150 -100 -50

TDC Tracker dif sum4 0

20

40

60

-100 -50 0 50 100

TDC Tracker dif sum5 0

200

400

-200 -150 -100 -50

TDC Tracker dif sum6 0

20

40

-100 -50 0 50 100

TDC Tracker dif sum7 0

200

400

-200 -150 -100 -50

TDC Tracker dif sum8 0

20

40

60

-100 -50 0 50 100

SCINTILLATOR TDC 1

r085 SCINTILLATORS

0

2

4

6

0 500 1000 1500

SCINTILLATOR ADC 1 0

100

200

300

400

0 500 1000 1500

SCINTILLATOR TDC 2 0

2

4

0 500 1000 1500

SCINTILLATOR ADC 2 0

500

1000

0 500 1000 1500

SCINTILLATOR TDC 3

-1

-0.5

0

0.5

1

0 500 1000 1500

SCINTILLATOR ADC 3 0

100

200

300

0 500 1000 1500 r085 SCINTILLATORS

-20

0

20

-20 0 20

track (x,y) at T1

-20

0

20

-20 0 20

track (x,y) at T2

-40

-20

0

20

40

-40 -20 0 20 40

track (x,y) at SC1

-40

-20

0

20

40

-40 -20 0 20 40

track (x,y) at SC2

-40

-20

0

20

40

-40 -20 0 20 40

track (x,y) at SC3