Fotec Box 408, (A382-11 and A382-8), Test in T11, measurement at 1000V (BWL 200MHz)

2

Data File = SP 060330094509 Fotec408-A382-11 A382-8 NoMagnet-vrttical-1000V.xls Upper Diamond = A382-11 Lower Diamond = A382-8 Maček ceramic Ass. #1 Tests in T11 with magnetic field (B=1.64T). During the measurement the magnet was off at the begining. The magnet was turned on after 4.7h (17000s, event 15728).