voltage [V]

-1000 -800 -600 -400 -200 0 200 400 600 800 1000 current [A]

-15 10

-14 10

-13 10

-12 10

-11 10

-10 10

-9 10

-8 10 m0,t=3s m1, t=3s m2, t=3s m0, t=5s

A230-02, side2