voltage [V]

-200 -150 -100 -50 0 50 100 150 200 current [A]

-2 -1.5 -1 -0.5 0 0.5 1 1.5 2^{-12} 10× m0,t=3s m1, t=3s m2, t=3s m0, t=5s

A230-02, side2