signal CH0, F406_NINO3ch3_run113, 602mV

Entries 5001 Mean 550.8 RMS 523.8 Underflow 0 Overflow 0 Integral 5001

-200 0 200 400 600 800 1000 1200 0 200 400 600 800 1000

1200

1400 signal CH0, F406_NINO3ch3_run113, 602mV

signal CH1, F406_NINO3ch3_run113, 602mV

Entries 5001 Mean 7.921 RMS 2.201 Underflow 0 Overflow 0 Integral 5001

-30 -20 -10 0 10 20 30 0 20 40 60 80 100 120 140 signal CH1, F406_NINO3ch3_run113, 602mV