U [V]

0 20 40 60 80 100 120 140 160 180 200

MP Signal [mV]

0 2 4 6 8 10 12 14

unirr =2e15/cm^2 Φ =1e15/cm^2 Φ =6e14/cm^2 Φ =4e15/cm^2 Φ =1e14/cm^2 Φ