2380

2382

2384

2386

2388

2390

2392

2394

2396

2398

2400

bias

x (steps) y (steps)

bias

x (steps) y (steps)

bias projected onto x bias projected onto y

-28200

-28000

-27800

-27600

-27400

-27200

-27000

-26800

-19000 -18800 -18600 -18400 -18200

-28200

-28000

-27800

-27600

-27400

-27200

-27000

-26800

-19000 -18800 -18600 -18400 -18200

2380

2382

2384

2386

2388

2390

2392

2394

2396

2398

2400

-19000 -18800 -18600 -18400 -18200

2380

2382

2384

2386

2388

2390

2392

2394

2396

2398

2400

-28000 -27500 -27000