1780

1782

1784

1786

1788

1790

1792

1794

1796

1798

1800

bias

x (steps) y (steps)

0 5 10 15 20 25 30 35 40 45 50

bias

x (steps) y (steps)

bias projected onto x bias projected onto y

-33500

-33000

-32500

-32000

-31500

-31000

-30500

-30000

-29500

-20000 -19000 -18000

-33500

-33000

-32500

-32000

-31500

-31000

-30500

-30000

-29500

-20000 -19000 -18000

1780

1782

1784

1786

1788

1790

1792

1794

1796

1798

1800

-20000 -19000 -18000

1780

1782

1784

1786

1788

1790

1792

1794

1796

1798

1800

-33000 -32000 -31000 -30000