52450

52500

52550

52600

52650

52700

52750

14800 14900 15000 15100

1887

1887.05

1887.1

1887.15

1887.2

1887.25

1887.3

1887.35

1887.4

MbiasI

52450

52500

52550

52600

52650

52700

52750

14800 14900 15000 15100 0

10

20

30

40

50

60

70

80

90

diodI

52450

52500

52550

52600

52650

52700

52750

14800 14900 15000 15100 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

SHIFTOUT

52450

52500

52550

52600

52650

52700

52750

14800 14900 15000 15100 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

SEU

04_11_02/seu041102_08.ps

x0=14800 dx=25 nx=13 xf= y0=52450 dy=25 ny=13 yf= z= ν= P= If=

52438

52546

52654

52762

14800 15000 dx 52438

52546

52654

52762

14800 15000 dy 52438

52546

52654

52762

14800 15000

SHIFTOUT

52438

52546

52654

52762

14800 15000 SEU 52438

52546

52654

52762

14800 15000

MbiasV

52438

52546

52654

52762

14800 15000

MbiasI

52438

52546

52654

52762

14800 15000

vddV

52438

52546

52654

52762

14800 15000

vddI

52438

52546

52654

52762

14800 15000

vssV

52438

52546

52654

52762

14800 15000

vssI

52438

52546

52654

52762

14800 15000

TIME

52438

52546

52654

52762

14800 15000

diodV

52438

52546

52654

52762

14800 15000

diodI