Fluence (10**13 n/cm2)

0 5 10 15 20

Gain (mV/fC)

0 10 20 30 40 50 60 70 80 90 100 Chip 0 Preamp 147.2 Shaper 31.2

0

Chip 0 Preamp 147.2 Shaper 31.2