Channel

0 50 100 150 200 250 300 350

Gain (mV/fC)

0 10 20 30 40 50 60 70 80 90 100 Gain-Pream174.8-Shaper24.0

Vcc = 3.5 V

0

Gain-Pream174.8-Shaper24.0

Channel

0 50 100 150 200 250 300 350

Gain (mV/fC)

0 10 20 30 40 50 60 70 80 90 100 Gain-Pream174.8-Shaper31.2

Vcc = 3.5 V

0

Gain-Pream174.8-Shaper31.2

Channel

0 50 100 150 200 250 300 350

Gain (mV/fC)

0 10 20 30 40 50 60 70 80 90 100 Gain-Pream174.8-Shaper24.0

Vcc = 3.7 V

0

Gain-Pream174.8-Shaper24.0

Channel

0 50 100 150 200 250 300 350

Gain (mV/fC)

0 10 20 30 40 50 60 70 80 90 100 Gain-Pream174.8-Shaper31.2

Vcc = 3.7 V

0

Gain-Pream174.8-Shaper31.2

Channel

0 50 100 150 200 250 300 350

Gain (mV/fC)

0 10 20 30 40 50 60 70 80 90 100 Gain-Pream174.8-Shaper24.0

Vcc = 3.9 V

0

Gain-Pream174.8-Shaper24.0

Channel

0 50 100 150 200 250 300 350

Gain (mV/fC)

0 10 20 30 40 50 60 70 80 90 100 Gain-Pream174.8-Shaper31.2

Vcc = 3.9 V

0

Gain-Pream174.8-Shaper31.2