Fluence (10**13 n/cm2)

0 5 10 15 20

Noise (ENC)

0 200 400 600 800 1000

1200

1400

Chip 0 Preamp 147.2 Shaper 31.2

0

Chip 0 Preamp 147.2 Shaper 31.2