Charge (fC)

2 4 6 8 10

Time (ns)

0 5 10 15 20 25 30 Time Walk Chip 0

0 5

Time Walk Chip 0

ABCD2T Time Walk for chip 0 after 1.5*10^{14} n/cm^2