Channel number

0 50 100 150 200 250

Gain (mV/fC)

0

20

40

60

80

100

120

Gain FE bias 239

Fluence: 0

Channel number

0 50 100 150 200 250

Gain (mV/fC)

0

20

40

60

80

100

120

Gain FE bias 239

Fluence: 10**13

Channel number

0 50 100 150 200 250

Gain (mV/fC)

0

20

40

60

80

100

120

Gain FE bias 82

Fluence: 6*10**13

Channel number

0 50 100 150 200 250

Gain (mV/fC)

0

20

40

60

80

100

120

Gain FE bias 36

Fluence: 2*10**14