0 100 200 300 400 500 600 700 0

50

100

150

200

250

Gain-Pream150.0-Shaper31.2-1.0fC Nent = 768 Mean = 382 RMS = 222.2

Gain Gain-Pream150.0-Shaper31.2-1.0fC