Channel

0 100 200 300 400 500 600 700

Threshold (mV)

0 50 100 150 200 250 300 350 400 50% points at 1 fC

0

50% points at 1 fC

Before irradiation

Channel

0 100 200 300 400 500 600 700

Threshold (mV)

0 50 100 150 200 250 300 350 400 50 % points at 1 fC

0

50 % points at 1 fC

After 2*10**14 neutrons