C (hours) o Time at 20

0 200 400 600 800 1000 1200 1400 1600 1800 o

V(time)/V(time=0)

0.8 0.82

0.84

0.86

0.88 0.9 0.92

0.94

0.96

0.98 1 = 1.0 mA f CMRP Annealing, I