)^2 n/cm 13 1 MeV eq. fluence (10

0 2 4 6 8 10 12 14 16 18 20

A) μ Base Current (

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

= 0.028

Proton k

= 0.021

Fastk

= 0.061

Thermal k

= 0.104

Thermal+Fast k

A μ Base Current at Ic = 10