Time (hours)

0 50 100 150 200 250 300 350

Bias (V)

0.526

0.528

0.53

0.532

0.534

0.536

0.538

0.54

0.542

0.544

0.546 V -5 T corrected: RMS = 4x10 2 n/cm 13 = 1 V/ 10 ΦΔ V/ Δ : ^2 n/cm 13 > 10 Φ At

No T correction

T correction

Osram Pin