Time (hours)

0 50 100 150 200 250 300 350

Bias (V)

8.02

8.025

8.03

8.035

8.04

8.045

No T correction

T correction

Sv/h) μ Na (~ 20 22 Expose to

Change of location C)^o

T ~ 2 Δ(

Source removed

R radfet