Resistance (Ohm)

10^7 10^8 10^9 10^{10} 10^{11}

Number of entries

0 100 200 300 400 500 600 700

Inter Line R hIR

Entries 4480 Mean 2.671e+11 RMS 2.341e+11

Layer A

Layer B

Cut

Inter Line R