/m) Ω Resistivity (

0 0.02 0.04 0.06 0.08 0.1 0.12 0.14 0.16 0.18 0.2

Number of entries

0 20 40 60 80 100 120 140 160 180 200 220

Resistivity of thick lines hrt

Entries 2240 Mean 0.1176 RMS 0.01623

Cut

Resistivity of thick lines