/m) Ω Resistivity (

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

Number of entries

0 100 200 300 400 500 600 700 800 900 Resistivity of thin lines hrt

Entries 7280 Mean 1.221 RMS 0.0704

Cut

Resistivity of thin lines