Photons in PMT window, clusters removed

hit-track

x(mm) y(mm)

NHIT on track at PMT

ID Entries Mean RMS

508 37177 0.7584 0.8746

NPMTHITS

Ntracks

(track at pmt mod 30) wt=1

x(mm) y(mm)

(track at pmt mod 30) wt=NPMTHIT

x(mm) y(mm)

0 0.25 0.5 0.75 1 1.25 1.5 1.75 2 2.25

Divided

x(mm) y(mm)

-10

-5

0

5

10

-10 -5 0 5 10 0

5000

10000

15000

20000

0 5 10 15

0

10

20

30

0 10 20 30 0

10

20

30

0 10 20 30

0

10

20

30

0 10 20 30