TDC Tracker dif sum1

r0000049 MWPC

0

100

200

300

-150 -100 -50 0

ID Entries

1031 4200

TDC Tracker dif sum2 0

20

40

60

-100 -50 0 50 100

ID Entries

1032 3012

TDC Tracker dif sum3 0

100

200

300

-150 -100 -50 0

ID Entries

1033 4200

TDC Tracker dif sum4 0

10

20

30

40

-100 -50 0 50 100

ID Entries

1034 2986

TDC Tracker dif sum5 0

100

200

300

400

-150 -100 -50 0

ID Entries

1035 4200

TDC Tracker dif sum6 0

20

40

60

-100 -50 0 50 100

ID Entries

1036 3080

TDC Tracker dif sum7 0 100 200 300 400

-150 -100 -50 0

ID Entries

1037 4200

TDC Tracker dif sum8 0

20

40

60

-100 -50 0 50 100

ID Entries

1038 3340

theta cerenkov

r0000049 RICH1

0

10

20

30

0 0.1 0.2 0.3 0.4 0.5

273.3 / 82 P1 200.7 P2 0.2486 P3 -0.4988E-04 P4 1.577 P5 0.2352 dθ=-0.0192993 θ_c(rad)

θ_c(rad)

N

-0.4

-0.2

0

0.2

0.4

-0.4 -0.2 0 0.2 0.4

ring in cerenkov space tx(rad) ty(rad) track geo acc1 active surface 0

5

10

15

0.2 0.4 0.6 0.8 1

PMT cell acc.=1 Full acc.= 0.842342

NHIT 0

10

20

0 20 40

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

10300 111 5.423 2.125 0.000 0.000 111.0

NHIT, thc in 3 sigma 0

10

20

0 10 20

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

10301 111 3.441 1.620 0.000 0.000 111.0

nf=-0.09 nb= 0.80

0

50

100

150

200

0 50 100 150 200

PMT hits theta cerenkov

r0000049 RICH2

0

5

10

15

0 0.1 0.2 0.3 0.4 0.5

1642. / 31 P1 -52.14 P2 0.3137 P3 -0.9423E-04 P4 49.14 P5 -161.8 dθ=-0.0133222 θ_c(rad)

θ_c(rad)

N

-0.4

-0.2

0

0.2

0.4

-0.4 -0.2 0 0.2 0.4

ring in cerenkov space tx(rad) ty(rad) track geo acc1 active surface 0

5

10

15

20

0.2 0.4 0.6 0.8 1

PMT cell acc.=0.380721 Full acc.= 0.125946

NHIT 0

10

20

30

0 20 40

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

20300 111 1.946 1.265 0.000 0.000 111.0

NHIT, thc in 3 sigma 0

20

40

0 10 20

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

20301 111 0.8559 0.9187 0.000 0.000 111.0

nf= 0.04 nb= 0.46 np= 0.80 0

50

100

150

0 50 100 150

PMT hits