theta cerenkov

r0000176 RICH1

0

200

400

600

0 0.1 0.2 0.3 0.4 0.5

2261. / 116 P1 1146. P2 0.2445 P3 0.1843 P4 -721.6 P5 -55.91 dθ=-0.0847877 θ_c(rad)

θ_c(rad)

N

-0.4

-0.2

0

0.2

0.4

-0.4 -0.2 0 0.2 0.4

ring in cerenkov space tx(rad) ty(rad) track geo acc1 active surface 0

200

400

0.2 0.4 0.6 0.8 1

PMT cell acc.=1 Full acc.= 0.855712

NHIT 0

200

400

600

800

0 10 20 30 40

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

10300 6479 7.697 4.632 0.000 0.000 6479.

NHIT, thc in 3 sigma 0

500

1000

1500

0 10 20

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

10301 6479 1.665 1.471 0.000 0.000 6479.

nf=32.69 nb=-4.06

0

50

100

150

200

0 50 100 150 200

PMT hits theta cerenkov

r0000176 RICH2

0

100

200

300

0 0.1 0.2 0.3 0.4 0.5

103.1 / 50 P1 -0.1162E+05 P2 -0.1552 P3 0.8233E-01 P4 -6683. P5 0.7116E-01 P6 -0.4394 P7 7199. P8 -3515.

-148.018 454.479

θ_c(rad)

N

-0.4

-0.2

0

0.2

0.4

-0.4 -0.2 0 0.2 0.4

ring in cerenkov space tx(rad) ty(rad) track geo acc1 active surface 0

100

200

0.2 0.4 0.6 0.8 1

PMT cell acc.=0.85013 Full acc.= 0.316712

NHIT 0

500

1000

1500

2000

0 10 20 30 40

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

20300 6479 2.172 1.950 0.000 0.000 6479.

NHIT, thc in 3 sigma 0

1000

2000

3000

4000

0 10 20

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

20301 6479 0.4749 0.7548 0.000 0.000 6479.

nf=602.50 nb= 0.00 np= 0.47 0

50

100

150

0 50 100 150

PMT hits theta cerenkov

r0000176 RICH3

0

20

40

60

0 0.1 0.2 0.3 0.4 0.5

106.3 / 45 P1 353.7 P2 0.6592E-01 P3 0.2568E-02 P4 123.2 P5 0.2603 P6 0.2388E-01 P7 -5.282 P8 63.84

0.140545 0.455286

θ_c(rad)

N

-0.4

-0.2

0

0.2

0.4

-0.4 -0.2 0 0.2 0.4

ring in cerenkov space tx(rad) ty(rad) track geo acc1 active surface 0

50

100

150

0.2 0.4 0.6 0.8 1

PMT cell acc.=0.609562 Full acc.= 0.0945664

NHIT 0

2000

4000

0 10 20 30 40

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

30300 6479 0.4496 0.8673 0.000 0.000 6479.

NHIT, thc in 3 sigma 0

2000

4000

6000

0 10 20

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

30301 6479 0.3241E-01 0.1897 0.000 0.000 6479.

nf= 0.60 nb= 0.00 np= 0.03 0

20

40

0 20 40

MCP pmt hits