/ ndf

2χ 7.666e+04 / 3165 p0 0.9± 170.5 p1 0.6± 2225 p2 0.4± 125.6 p3 0.10± 26.13 p4 2.2± 1641 p5 0.3± 249.9 p6 0.0± 8.533e+04 p7 0.0± 104.8 p8 0.0± 20

ADC 0 500 1000 1500 2000 2500 3000 3500

N

0

50

100

150

200

Peak1= 2225 Peak2= 105 Sigma=125.6 Resolution FWHM=0.139