accepted

Best candidate selection ID Entries Mean RMS

100 4176968 1.924 0.6664E-01

mass (GeV/c^2)

rejected

ID Entries Mean RMS

200 196302 1.924 0.6980E-01

mass (GeV/c^2)

accepted

ID Entries Mean RMS

101 4176968 6.493 4.522

χ^{2vtx} + χ^{2IP}

rejected

ID Entries Mean RMS

201 196302 7.931 4.765

χ^{2vtx} + χ^{2IP}

0

2000

4000

6000

8000

10000 x 10

1.8 1.85 1.9 1.95 2 2.05 0 250 500 750 1000

1250

1500

1750

2000

2250

1.8 1.85 1.9 1.95 2 2.05

0 200 400 600 800 1000

1200

1400

1600 x 10^2

0 10 20 30 0

1000

2000

3000

4000

5000

6000

0 10 20 30